0 100 200 300 400

0 100 200 300 400

0 100 200 300 400

20 30 40 50

ALLCHAN 0.9998E+05 635.6 / 560 P1 165.5

ALLCHAN 0.9999E+05 522.5 / 560 P1 165.5

ALLCHAN 0.1000E+06 1011. / 560 P1 164.9

Entries

ALLCHAN 0.9998E+05 581.8 / 560 P1 165.6

ALLCHAN 0.9996E+05 4135. / 560 P1 159.4

ALLCHAN 0.9985E+05 560.1 / 560 P1 165.6

E, MeV

20 30 40 50