0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 10 20 30 40 50 60 70 0 0.0025

0.005

0.0075

0.01

0.0125

0.015

0.0175

0.02

0 10 20 30 40 50 60 70

θ_0 , degree

Energy resolution (HWHM), MeV

Angular resolution (HWHM)