muon stopping Z in target 0 25 50 75 100 125 150 175 200 225

-0.01 -0.005 0 0.005 0.01

ID Entries Mean RMS

1 5519 0.4513E-03 0.1893E-02

cm yield x of stoped muon in target 0 20 40 60 80 100 120 140

-4 -2 0 2 4

ID Entries Mean RMS

101 5519 -0.3172E-01 1.661

cm yield y of stoped muon in target 0 20 40 60 80 100 120 140

-4 -2 0 2 4

ID Entries Mean RMS

102 5519 -0.3146E-01 1.659

cm yield