muon stopping Z in target 0 50 100 150 200 250 300 350

-0.01 -0.005 0 0.005 0.01

Δp/p (Ψ) 0 0.5 2 4 6

cm yield x of stoped muon in target 0 50 100 150 200 250 300 350 400 450

-4 -2 0 2 4

Δp/p = 0.5Ψ

cm yield

0

20

40

60

80

100

-2 0 2 4 6 8 Δp/p (Ψ) muon stop rate, (Ψ)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-2 0 2 4 6 8 Δp/p (Ψ) σ_x,σ_y, (cm)