muon stopping Z in target 0 50 100 150 200 250

-0.01 -0.005 0 0.005 0.01

ID Entries Mean RMS

1 6757 0.6251E-03 0.1956E-02

cm yield x of stoped muon in target 0 50 100 150 200 250

-4 -2 0 2 4

ID Entries Mean RMS

101 6757 -0.6356E-02 1.060

cm yield y of stoped muon in target 0 50 100 150 200 250

-4 -2 0 2 4

ID Entries Mean RMS

102 6757 -0.1198E-01 1.068

cm yield