-10 -5 0 5 10 0

0.02

0.04

0.06

0.08

0.1

0.12

mean z position (um)

#in PC(+1)/# in PC(-1)

Ratio +1/-1 vs mean stopping dist.

-10 -5 0 5 10 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0.05

mean z position (um)

#in PC(+2)/# in PC(-2)

Ratio +2/-2 vs mean stopping dist.