0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 -1

-0.999

-0.998

-0.997

-0.996

-0.995

-0.994

-0.993

Helix radius (cm) at first drift chamber

Spin at target

Focus at -150 cm; Multiple Scattering on