                                                                           ANSYS 5.3
                                                                           APR  8 1998
                                                                           14:09:03
                                                                           PLOT NO.   6
                                                                           NODAL SOLUTION
                                                                           STEP=1
                                                                           SUB =1
                                                                           TIME=1
                                                                           SEQV     (AVG)
                                                                           DMX =.578E-03
                                                                           SMN =7927
                                                                           SMX =.215E+07
                                                                           SMXB=.492E+07

1

                                                                  MN

                   MX

                                        X

                                    Y

                                    Z

                                                                                7927
                                                                                246147
                                                                                484367
                                                                                722587
                                                                                960807
                                                                                .120E+07
                                                                                .144E+07
                                                                                .168E+07
                                                                                .191E+07
                                                                                .215E+07

200 Kg at cantilevered plate, von Mises stresses