                                                                           ANSYS 5.3
                                                                           APR  8 1998
                                                                           15:41:55
                                                                           PLOT NO.   1
                                                                           NODAL SOLUTION
                                                                           STEP=1
                                                                           SUB =1
                                                                           TIME=1
                                                                           UY
                                                                           RSYS=0
                                                                           DMX =.001569
                                                                           SEPC=63.87
                                                                           SMN =-.001569

1

                         MN

MX

                 X

              Y

           Z

                                                                                -.001569
                                                                                -.001394
                                                                                -.00122
                                                                                -.001046
                                                                                -.872E-03
                                                                                -.697E-03
                                                                                -.523E-03
                                                                                -.349E-03
                                                                                -.174E-03
                                                                                0

200 Kg at cantilevered plate, Total Deflection