Mar. 30/99

                                                                                                    9U Eurocrate versus CAMAC Option

1) 9U Eurocrate Option - 21 Slots X 32 Ch. = 672 Chs/Crate

                                                    Part Description # Req´d Cost/unit (C$) Total (C$ )

                                                                      Crate Kit 1 600.00 600.00

                                                                Guide Rails 42 1.25 52.50

                                                            Module Panel 21 30.00 630.00

                                                    Power Connector 42 5.00 210.00

                                                                      Fan Tray 1 150.00 150.00

                                                                                Fan 3 60.00 180.00

                                                              5V/25A P.S. 1 250.00 250.00

                                                             5V/18A P.S. 1 190.00 190.00

                                                                Power PCB 1 50.00 50.00

                                                        Misc. Hardware 1 150.00 150.00

Total 2462.50

Cost/Channel = $3.66

2) CAMAC Option - 25 Slots X 16 Ch. = 400 Chs/Crate (Crates Available)

                                                  Part Description # Req´d Cost/unit (C$) Total (C$)

                                                  Module Kit 25 60.00 1500.00

Total 1500.00

Cost/Channel = $3.75

*See Figure 1 on next page...

Figure 1  - Rack Configuration of 9U Eurocrate and CAMAC Options