0.2

0.4

0.6

0.8

1

2 4 6 8 10 12 14 16 18

Q4=0 Q8=.230 Q10=.425

Q12=.589 Q14=.944 Q16=1.146

PULSE HEIGHT vs POSITION

for E32 DME BLV

irradiated

area

I = 60 nA/cm

0

0.2

0.4

0.6

0.8

1

2 4 6 8 10 12 14 16 18

Q3=0 Q4=.034 Q6=.147

Q8=.255 Q9=.448 Q11=.758

PULSE HEIGHT vs POSITION

for E31 DME PLG

irradiated

area

I = 60 nA/cm

 0.2

 0.4

 0.6

 0.8

        1

               2 4 6 8 10 12 14 16 18

                                       Q3=0 Q6=.666 Q8=.802

                                       Q10=1.018 Q12=1.722 Q13=1.979

                                              PULSE HEIGHT vs POSITION

                                                                for E30 DME PRH (TEF @ 0.666)

                                                                                                     irradiated

                                                                                                     area

                           I = 90 na/cm

0.2

0.4

0.6

0.8

       1

              2 4 6 8 10 12 14 16 18

                                      Q3=0 Q4=0 Q5=0 Q6=0 Q7=0

                                          PULSE HEIGHT vs POSITION

                                                                               for E29 DME REF

                                                                                                     irradiated

                                                                                                     area

                             I = 0 nA/cm