0.2

0.4

0.6

0.8

1

1.2

2 4 6 8 10 12 14 16 18

Q3=0 Q5=.051 Q7=.078

Q9=.130 Q11=.211 Q12=.229

PULSE HEIGHT vs POSITION

for E36 DME RTF

irradiated

area

I = 20 nA/cm

0

0.2

0.4

0.6

0.8

1

2 4 6 8 10 12 14 16 18

Q3=0 Q5=.034 Q7=.071

Q8=.094 Q9=.119 Q10=.209

PULSE HEIGHT vs POSITION

for E35 DME RTV

irradiated

area

I = 20 nA/cm

      0.2

      0.4

      0.6

      0.8

             1

                    2 4 6 8 10 12 14 16 18

                                                     Q4=0 Q12=.288 Q14=.330

                                                     Q16=.561 Q17=.606

                                         PULSE HEIGHT vs POSITION

                                                        for E34 DME LTX -->LTT (@0.288)

                                                                                                    irradiated

                                                                                                    area

                              I = 35 nA/cm

0.2

0.4

0.6

0.8

       1

              2 4 6 8 10 12 14 16 18

                                              Q4=0 Q11=.276 Q12=.299

                                              Q14=.343 Q16=.535 Q17=.581

                                              PULSE HEIGHT vs POSITION

                                                          for E33 DME LDP -->NEO (@ 0.276)

                                                                                                     irradiated

                                                                                                     area

                             I = 35 nA/cm