0

0.2

0.4

0.6

0.8

1

2 4 6 8 10 12 14 16 18

Q0=0 Q1=.008 Q2=.027

Q3=.042 Q5=.071 Q6=.086

PULSE HEIGHT vs POSITION

for E40 DME UV2

irradiated

area

I = 20 nA/cm

0

0.2

0.4

0.6

0.8

1

2 4 6 8 10 12 14 16 18

Q0=0 Q1=.008 Q2=.025 Q3=.080

PULSE HEIGHT vs POSITION

for E39 DME UV1

irradiated

area

I = 20 nA/cm

0.2

0.4

0.6

0.8

       1

              2 4 6 8 10 12 14 16 18

                                               Q4=0 Q6=.029 Q8=.053

                                               Q10=.084 Q12=.154 Q13=.177

                                           PULSE HEIGHT vs POSITION

                                                                               for E38 DME AWL

                                                                                                      irradiated

                                                                                                      area

                          I = 10 nA/cm

 0.2

 0.4

 0.6

 0.8

        1

               2 4 6 8 10 12 14 16 18

                                               Q5=0 Q7=.031 Q9=.056

                                               Q11=.088 Q13=.109 Q15=.185

                                              PULSE HEIGHT vs POSITION

                                                                          for C79 - E37 DME PRL

                                                                                                      irradiated

                                                                                                      area

                            I = 10 nA/cm