                                1.10

                                1.15

                                1.20

                                1.25

                                1.30

                                1.35

                                1.40

                                1.45

                                1.50

                                1.55

                                1.60

TENSION (lb/in)

                                                  0 20 40 60 80 100 120 140 160 180 200 220 240 260

                                                                                                                   TIME (Days)

                                                                   FOIL02 -- TENSION VS TIME

tau = 105 days

final tension = 1.16 lb/in

(76%)

1.30

1.35

1.40

1.45

1.50

1.55

1.60

1.65

1.70

1.75

1.80

1.85

1.90

1.95

2.00

0 20 40 60 80 100 120 140 160 180 200 220 240 260

TIME (Days)

FOIL03 -- TENSION VS TIME

tau = 82 days

final tension = 1.40 lb/in

(73%)

0.96

0.98

1.00

1.02

1.04

1.06

1.08

1.10

1.12

1.14

1.16

1.18

1.20

1.22

1.24

1.26

1.28

1.30

0 20 40 60 80 100 120 140 160 180 200 220 240 260

TIME (Days)

FOIL01 -- TENSION VS TIME

tau = 173 days

final tension = 0.94 lb/in

(79%)

                                  0.70

                                  0.72

                                  0.74

                                  0.76

                                  0.78

                                  0.80

                                  0.82

                                  0.84

                                  0.86

                                  0.88

                                  0.90

                                                      0 20 40 60 80 100 120 140 160 180 200 220 240 260

                                                                                                                      TIME (Days)

                                                                      FOIL00 -- TENSION VS TIME

tau = 160 days

final tension = 0.72 lb/in

(86%)