0.2

0.4

0.6

0.8

         1

1.2

                  2 4 6 8 10 12 14 16 18

                                                                  Q0=0 Q1=.019 Q2=.054

                                                                  Q3=.091 Q4=.130

                                                    PULSE HEIGHT vs POSITION

                                                                                                  for E10 DME RTV

irradiated

area

 0.2

 0.4

 0.6

 0.8

          1

 1.2

                   2 4 6 8 10 12 14 16 18

                                      Q0=0 Q1=.136 Q2=.193 Q3=.251

                                                     PULSE HEIGHT vs POSITION

                                                                                                 for E09 DME CEX

irradiated

area