 0.2

 0.4

 0.6

 0.8

          1

 1.2

                  2 4 6 8 10 12 14 16 18

                                                                  Q0=0 Q1=.095 Q2=.161

                                                                  Q3=.228 Q4=.353

                                                     PULSE HEIGHT vs POSITION

                                                                                                 for E08 DME CON

irradiated

area

0.2

0.4

0.6

0.8

         1

1.2

                 2 4 6 8 10 12 14 16 18

                                                                 Q0=0 Q1=.095 Q2=.161

                                                                 Q3=.228 Q4=.373

                                                     PULSE HEIGHT vs POSITION

                                                                                                 for E07 DME 2TN

irradiated

area