 0.2

 0.4

 0.6

 0.8

          1

 1.2

                  2 4 6 8 10 12 14 16 18

                                                                   Q0=0 Q1=.081 Q2=.104

                                                                   Q3=.127 Q4=.151

                                                      PULSE HEIGHT vs POSITION

                                                                                                  for E06 DME RT2

irradiated

area

0.2

0.4

0.6

0.8

         1

1.2

                  2 4 6 8 10 12 14 16 18

                                                         Q0=0 Q1=0.020 Q2=0.044

                                                         Q4=0.064 Q5=0.120

                                                    PULSE HEIGHT vs POSITION

                                                                                                  for E05 DME GLU

irradiated

area