                                                                      0.00

                                                                      0.05

                                                                      0.10

                                                                      0.15

                                                                      0.20

                                                                      0.25

                                                                      0.30

                                                                      0.35

                                                                      0.40

                                                                      0.45

                                                                      0.50

Deflection (mm)

                                                                                   0.00 0.02 0.04 0.06 0.08 0.10 0.12 0.14

Pressure (Torr)

Deflection vs Pressure

for Foil 02

                                                                                                              deflection = 3.53 mm/Torr

                                                                           0.0

                                                                           0.5

                                                                           1.0

                                                                           1.5

                                                                           2.0

                                                                           2.5

                                                                           3.0

                                                                           3.5

                                                                           4.0

                                                                           4.5

                                                                           5.0

                                                                                         0 0.2 0.4 0.6 0.8 1 1.2 1.4

Pressure (Torr)

Deflection vs Pressure

for Foil 02

                                                                                                              deflection = 3.51 mm/Torr

                                                                           V = Ft = (b(Pi)r^2)/2

                                                                           b = (2Ft)/((Pi)r^2)

                                                                           gas compression ~ 761/760   is negligible