                                                        0

                                            0.2

                                            0.4

                                            0.6

                                            0.8

                                                        1

                                            1.2

                                            1.4

                                            1.6

                                            1.8

Pressure (Torr)

                                                                    0 100 200 300 400 500

Time (sec)

3/17 3/22 3/26

Pressure vs Time

Foil 03 with flow = 50 cc/min

leak rate = 6.3 cc/min