(MeV/c) tot US P

15 20 25 30 35 40 45 50

/ ndf

2χ 18.82 / 28 Prob 0.9036 p0 0.01931 ± -0.07806 p1 0.000549 ± -0.001333

) (MeV/c) θ )(US cos tot PΔ(

-0.3

-0.2

-0.1

0

0.1

0.2_{/ ndf2χ 18.82 / 28}

± ±

/ ndf

2χ 35.81 / 28 Prob 0.1476 p0 0.00687 ± -0.08409 p1 0.000194 ± -0.001314

Geant

Data

) vs Momentum, Graphite/Mylar Target θ (Energy loss)(cos