H61110

Entries 40880 Mean 49.07 RMS 48.5

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

Raw TDCwidth Module X Wire 10 H61110

Entries 28759 Mean 44.43 RMS 46.92

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

H61110

Raw TDCwidth Module X Wire 10

H61110

Entries 23168 Mean 40.6 RMS 44.7

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

Raw TDCwidth Module X Wire 10 H61110

Entries 4210 Mean 40.23 RMS 45.75

0 50 100 150 200 250 300 0 100 200 300 400 500 600 700 H61110

Raw TDCwidth Module X Wire 10