-200 -199 -198 -197 -196

htemp

Entries 1825116 Mean -197.6 RMS 1.501

0 200 400 600 800 1000

1200

1400

1600

1800

2000 210 × TEC_z {TEC_z < -195. && TEC_fitnx > 5}