0 50 100 150 200 250 300 350

Entries 321 Mean 52.66 RMS 55.45 / ndf

2χ 13.43 / 17 Prob 0.7069 p0 2.2±

3542 p1 0.0262 ± -0.3445

3400

3450

3500

3550

3600

±

TWalkX1