0 1000

2000

3000

4000

5000

6000

7000

8000

0 1 2 3 4 5 6

Drift distance(cm)

Drift time (ns)

-150

-100 -50 0 50 100 150 200 250

0 1 2 3 4 5 6

Drift distance(cm) X module Wire 24

Δdrift time (ns)

2500

3000

3500

4000

4500

2.5 3 3.5 4 4.5

2050

2100

2150

2200

2250

2300

2350

2.35 2.4 2.45 2.5 2.55

3300

3350

3400

3450

3500

3550

3600

3.35 3.4 3.45 3.5 3.55

4700

4750

4800

4850

4900

4950

4.35 4.4 4.45 4.5 4.55

0.96

0.98

1

1.02

1.04

1.06

1.08

1.1

1000 2000 3000 4000 5000 6000 7000 8000

T_m (ns)

Ratio (=T_G/T_m)

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

1.5

2

2.5

0 1000 2000 3000 4000 5000 6000 7000 8000

T_m (ns)

T_G - T_m*Ratio (ns)

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

1.5

2

2.5

0 1000 2000 3000 4000 5000 6000 7000 8000

T_G (ns)

T_m - T_G/Ratio (ns)