H61234

Entries 42583 Mean 2.296 RMS 1.264

0 1 2 3 4 5 6 7 8 9 10 0 2000

4000

6000

8000

10000

12000

14000

16000

Raw TDChits Module Y Wire 10 H61234

Entries 31281 Mean 2.089 RMS 1.255

0 1 2 3 4 5 6 7 8 9 10 0

2000

4000

6000

8000

10000

12000

H61234

Raw TDChits Module Y Wire 10

H61234

Entries 26129 Mean 1.992 RMS 1.16

0 1 2 3 4 5 6 7 8 9 10 0

2000

4000

6000

8000

10000

Raw TDChits Module Y Wire 10 H61234

Entries 5210 Mean 1.863 RMS 1.123

0 1 2 3 4 5 6 7 8 9 10 0

500

1000

1500

2000

2500 H61234

Raw TDChits Module Y Wire 10