-0.5 -0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0.5

h61697

Entries 19014 Mean 0.009781 RMS 0.09648

0

200

400

600

800

1000

ddX(TEC-DC)