-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

/ ndf

2χ 3.778e-05 / 3 Prob 1 p0 0.050219 ± 0.007549 p1 0.0448 ± -0.0129

-0.03

-0.02

-0.01

0

0.01

0.02

0.03 ± ± ± ±

x0 versus x for y=-2 cm x0 versus x for y=-1 cm x0 versus x for y=0 cm x0 versus x for y=1 cm x0 versus x for y=2 cm

x0 versus x for y=0 cm

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

/ ndf

2χ 7.968e-05 / 3 Prob 1 p0 0.03137 ± 0.00492 p1 0.016255 ± 0.002384

-0.03

-0.02

-0.01

0

0.01

0.02

0.03 ± ± ± ±

y0 versus x for y=-2 cm y0 versus x for y=-1 cm y0 versus x for y=0 cm y0 versus x for y=1 cm y0 versus x for y=2 cm

y0 versus x for y=0 cm

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

/ ndf

2χ 0.0007259 / 3 Prob 1 p0 0.040601 ± 0.008242 p1 0.025607 ± -0.003167

-0.03

-0.02

-0.01

0

0.01

0.02

0.03 ± ± ± ±

x0 versus y for x=-2 cm x0 versus y for x=-1 cm x0 versus y for x=0 cm x0 versus y for x=1 cm x0 versus y for x=2 cm

x0 versus y for x=0 cm

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

/ ndf

2χ 0.001274 / 3 Prob 1 p0 0.048383 ± 0.005796 p1 0.0468 ± -0.0137

-0.03

-0.02

-0.01

0

0.01

0.02

0.03 ± ± ± ±

y0 versus y for x=-2 cm y0 versus y for x=-1 cm y0 versus y for x=0 cm y0 versus y for x=1 cm y0 versus y for x=2 cm

y0 versus y for x=0 cm