dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=0.200cm Δ X=-0.200cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=0.200cm Δ X=-0.000cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=0.200cm Δ X=0.200cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=0.000cm Δ X=-0.200cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=0.000cm Δ X=-0.000cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=0.000cm Δ X=0.200cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=-0.200cm Δ X=-0.200cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=-0.200cm Δ X=-0.000cm, Δμ 1000xdP

dX(rad) Δ -0.005 0 0.005 dY(rad) Δ

-0.005

0

0.005

-2.5 -2 -1.5 -1 -0.5 0 0.5 Y=-0.200cm Δ X=0.200cm, Δμ 1000xdP