Y (cm)

-2 -1 0 1 2

-0.02

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

0.02

Mean dx angle for each Y vs X pixel_{mrad}

statistics σ2 Mean dy angle for each Y vs X pixel

X (cm)

-2 -1 0 1 2

Y (cm)

-2 -1 0 1 2

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

mrad

X (cm)

-2 -1 0 1 2 0

0.005

0.01

0.015

0.02

0.025

RMS dy angle for each Y vs X pixel_{mrad}

0 0.005

0.01

0.015

0.02

0.025

RMS dx angle for each Y vs X pixel

statistics σ1 mrad