0 10 20 30 40 50 hmc Entries 2.95234e+08 Mean 27.62 RMS 1.509

210

310

410

510

610

710

810 Overlay MC(red) and data(blue) after adding pions hdata_{Entries 1.312071e+08}

Mean 27.63 RMS 1.511