Total Momentum (MeV/c)

10 15 20 25 30 35 40 45 50

<NDOF>

20

25

30

35

40

45 Upstream Downstream

| < 1.0 θ 0.9 < |cos

| < 0.9 θ 0.8 < |cos

| < 0.8 θ 0.7 < |cos

| < 0.7 θ 0.6 < |cos

| < 0.6 θ 0.5 < |cos

| < 0.5 θ 0.4 < |cos

MC Gen 235 θ <NDOF> vs Momentum for bins of 0.1 in cos