Momentum(MeV/c)

0 20 40 θ cos

-1 -0.5 0 0.5 1 0 20000

40000

60000

0 20000

40000

60000 θ dx dcos genΓd

Momentum (MeV/c)

0 20 40 θ cos

-1 -0.5 0 0.5 10

20000

40000

0 20000

40000 θ dx dcos recΓd