Momentum (MeV/c)

0 10 20 30 40 50 θ cos

-1

-0.5

0

0.5

1

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

versus momentum θ Reconstructed positron cos

Count

>13.7 MeV/c lp <38.6 MeV/c p