Positron Total Momentum (MeV/c)

0 10 20 30 40 50 θ cos

-1 -0.8

-0.6

-0.4

-0.2 -0 0.2 0.4 0.6 0.8 1 michel2_pc6 Entries 5.857194e+07

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

Data Set 35 Michel Spectrum