Decay Time(ns)

0 2000 4000 6000 8000 10000

Sum_Asym

/ ndf

2χ 16.132 / 18 Prob 0.583337 (0)

1μP 0.123165 ± -0.139515 (1/ns)

1λ 0.000163569 ± -0.000217684 (0)

2μP 0.127712 ± -0.801163 (1/ns)

2λ 1.16928e-05 ± -1.13342e-06

(t)μ P

-1 -0.95

-0.9

-0.85

-0.8

-0.75

± ± ± ±

Set1_Asym

/ ndf

2χ 28.6108 / 20 Prob 0.09571 (0)

1μP 0.007067 ± -0.154079 (0)

2μP 0.004087 ± -0.785329 ± ± Set4_Asym

/ ndf

2χ 11.1012 / 20 Prob 0.943554

(0)

1μP 0.010662 ± -0.120074 (0)

2μP 0.006166 ± -0.834854 ± ±

Set22_Asym

/ ndf

2χ 12.8528 / 20 Prob 0.88361 (0)

1μP 0.008030 ± -0.133134 (0)

2μP 0.004644 ± -0.812665 ± ±

(t)μ

Asymmetry Analysis P

Sets 2, 3, 6, 7, 11, 16, 17, 22, 23, 24