0.66

0.68

0.7 , Rec./Thrown in fiducial θ cos

0.64

0.66 p < 1MeV/c Δ , Rec./Thrown in fiducial, θ cos

θ cos -1 -0.5 0 0.5 1 θ

0.02

0.04

0.06 p > 1MeV/c Δ , Rec./Thrown in fiducial, θ cos