1000 2000 3000 4000 5000 6000 7000 8000 9000

/ ndf

2χ 135.019 / 157 Prob 0.89715 (0) μP 0.00064 ± -1.00239 (ns) σ 4623.3 ± 51110.5

-1.03

-1.02

-1.01 -1 -0.99

-0.98

-0.97

-0.96

-0.95

± ±

(t) fit to Gaussian μ 2004 Data P

1000 2000 3000 4000 5000 6000 7000 8000 9000

/ ndf

2χ 136.915 / 157 Prob 0.874451

(0) μP 0.00099 ± -1.00476 (1/ns) λ 2.82979e-07 ± -1.54964e-06

-1.03

-1.02

-1.01 -1 -0.99

-0.98

-0.97

-0.96

-0.95 / ndf

± ±

(t) fit to Exponential μ 2004 Data P

1000 2000 3000 4000 5000 6000 7000 8000 9000

/ ndf

2χ 105.189 / 123 Prob 0.875446 (0) μP 0.00051 ± -1.01061 (ns) σ 3801.8 ± 52045.8

-1.03

-1.02

-1.01 -1 -0.99

-0.98

-0.97

-0.96

-0.95

± ±

(t) fit to Gaussian μ 2004 MC P

1000 2000 3000 4000 5000 6000 7000 8000 9000

/ ndf 2χ 110.733 / 123 Prob 0.778422

(0) μP 0.00078 ± -1.01275 (1/ns) λ 2.20886e-07 ± -1.44334e-06

-1.03

-1.02

-1.01 -1 -0.99

-0.98

-0.97

-0.96

-0.95

± ±

(t) fit to Exponential μ 2004 MC P