1000 2000 3000 4000 5000 6000 7000 8000 9000

/ ndf

2χ 12.9265 / 20 Prob 0.880516 (0) μP 0.00099 ± -1.00448 (1/ns) λ 2.79906e-07 ± -1.45194e-06

-1.005 -1 -0.995

-0.99

± ±

(t) with Extrapolation in Fit μP

1000 2000 3000 4000 5000 6000 7000 8000 9000

/ ndf

2χ 12.9265 / 21 Prob 0.911177 (0) μP 0.00049 ± -1.00448

-1.01 -1 -0.99

-0.98

±

(t) with Extrapolation Fixed μP