Total Momentum (MeV/c)

52 53 0

200

400

<154.2 deg θ 151.6<

Total Momentum (MeV/c)

52 53 0

200

400

<126.9 deg θ 125.5<

Total Momentum (MeV/c)

52 53 0

200

400 <53.6 deg θ 53.1<

Total Momentum (MeV/c)

52 53 0

200

400 <28.4 deg θ 25.8<