B2+5G A+B

PC5 stop

stop 1/2

stop 3/4 A

hi rate

aperture

stop 3/4 B

0.995

1

1.005

1.01

0.0006 (stat) ± = 1.0003 ξ_μP

/NDOF = 3.0/6 2χ

from Refit with Blackbox Open ξ_μP