1 1.5 2 2.5 3 3.5 4 4.5 σ Width

0.015

0.02

0.025

0.03

30-35 MeV/c Data MC

θ 1/sin

1 1.5 2 2.5 3 3.5 4 4.5 σΔ Data-MC difference

-0.005 0 0.005