End-point resolution [keV/c]

60 65 70 75 80 ηΔ

0 100 200 300 400 / ndf ^2χ 3.853 / 3 Prob 0.2778 p0 145.5±

-556.5 p1 2.492± 9.53

/ ndf

2χ 3.853 / 3