End-point resolution [keV/c]

60 65 70 75 80 δΔ

-7 -6 -5 -4 -3 -2 -1 0 / ndf

2χ 2.552 / 3 Prob 0.4659 p0 1.443± 14.89 p1 0.0247 ± -0.2549 ±