[ns]

3200 3400 3600 3800 4000 4200 0 200 400 600 800 1000

1200

1400

1600

1800

2000

TDC hit time, wire 12

/ ndf

2χ 53 / 17 Prob 1.427e-05 Constant 15.4±

2015 Mean 0.7±

3714 Sigma 1.15±

83.56