s]μ Drift time [

0 1 2 3 4 5 6 7

Drift distance [ns]

1 2 3 4 5 6

/ ndf

2χ 1.778 / 7 Prob 0.9711 p0 0.0064± 0.5971 p1 0.007574 ± 0.7815 p2 0.002384 ± -0.01017 p3 0.0002124 ± 0.0007901

± ± ± s]μ Drift time [

0 1 2 3 4 5 6 7 m] μ Residuals [

-100

-50

0

50

100