Hit time [ns]

-120 -115 -110 -105 -100 0 1000

2000

3000

4000

5000

6000

7000 / ndf ^2χ 55.64 / 45 Prob 0.1328 p0 0.0± -108.8 p1 0.013± 1.529 p2 262.039 ± 1.867e+04 p3 0.2698 ± 0.1778 p4 0.117± 9.677