Plane #

0 5 10 15 20 25 30 35 40 45

Wire time offsets difference[ns]

-0.4

-0.2 0 0.2 0.4 0.6 0.8 / ndf

2χ 219.5 / 218 Prob 0.4592 p0 0.01106 ± 0.2117 p1 0.01564 ± -0.01313 ± ±