Delta Correction [degrees]

-0.003 -0.002 -0.001 0 0.001 0.002 0.003

Number Of Planes

0 1 2 3 4 5 6 7 8 9 Rotation alignment Precision_{Entries 44}

Mean 0.0001657 RMS 0.001336

Rotation alignment Precision