Differential pressure [mTorr]

95 100 105 110 115 120 125 130 135 140

T [ns] Δ Average drift time difference

-10 -5 0 5 10 / ndf

2χ 5.786 / 7 Prob 0.5649 p0 2.586±

-55.94 p1 0.02232 ± 0.4904 ±