-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

Count

210

310

410

510

| [MeV/c] θ ) |cos DS - p US | = (p θ p |cos Δ -0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

%

-30 -20 -10 0 10 20 30_{2 3 4 5 6 7 8 9 10}

Count

210

310

410

510

2 3 4 5 6 7 8 9 10 -30 -20 -10 0 10 20 30

Data MC

(Data - MC) / MC